\documentclass[a4paper,10pt,dvips,fleqn,notitlepage,twocolumn,draft]{article}
\usepackage{times}
\usepackage[latin1]{inputenc}
\usepackage{amsfonts}
\usepackage{amsmath}
\usepackage{amssymb}
\usepackage{amsthm}
\usepackage[USenglish]{babel}
\usepackage{fontenc}
\usepackage{graphicx}

%%%%%%%%%%%%%%%
% page layout %
%%%%%%%%%%%%%%%

\setlength{\columnsep}{8mm} % space between columns
\setlength{\footskip}{12mm} % baseline footer to end of body
\setlength{\textwidth}{172mm} % body width
\setlength{\textheight}{264mm} % body height
\setlength{\hoffset}{-1in} % reset page offset
\setlength{\voffset}{-1in} % reset page offset
\setlength{\oddsidemargin}{19mm} % left margin
\setlength{\evensidemargin}{19mm} % left margin
\setlength{\topmargin}{11mm} % header to page top
\setlength{\headheight}{5mm} % header height
\setlength{\headsep}{5mm} % header to text

%%%%%%%%%%%%%%%%%%%
% format headings %
%%%%%%%%%%%%%%%%%%%

\usepackage{titlesec} % load package
\titleformat*{\section}{\bfseries\large} % bold sections
\titlespacing{\section}{0pt}{*1}{*0} % one line spacing before section
% none after

%%%%%%%%%%%%%%%%%%%%%%%%
% paragraph formatting %
%%%%%%%%%%%%%%%%%%%%%%%%

\setlength{\parindent}{5mm} % set indent

%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% page headers and footers %
%%%%%%%%%%%%%%%%%%%%%%%%%%%%

\usepackage{fancyhdr} % load package

% edit plain page style (used by default for first page)
\fancypagestyle{plain}{
  \setlength{\headheight}{21mm} % header height
  \fancyhf{} % reset header and footer
  \fancyhead[L]{\bfseries Proceedings of the 10th International
  Symposium on Experimental\\ Computational Aerothermodynamics of
  Internal Flows\\ 4--7 July 2011, Brussels, Belgium
  \rule{\textwidth}{0.4pt}\\} % line inside header
  \fancyhead[R]{\bfseries\large ISAIF10-***}
  \renewcommand{\headrulewidth}{0.pt} % no line below header
  \renewcommand{\footrulewidth}{0.pt} % line above footer
  \fancyfoot[L]{\vspace{-20.5mm}\rule{\textwidth}{0.4pt}\\[0pt]ISAIF10} % left footer
  \fancyfoot[R]{\vspace{-19mm}\thepage} % right footer
}
\setlength{\textheight}{227mm} % set body height for first page

% set page style fany as default ant edit it
\pagestyle{fancy}
\fancyhf{} % reset header and footer
\renewcommand{\headrulewidth}{0.pt} % no line below header
\renewcommand{\footrulewidth}{0.4pt} % line above footer
\fancyfoot[L]{ISAIF10} % left footer
\fancyfoot[R]{\thepage} % right footer

%%%%%%%%%%
% floats %
%%%%%%%%%%

\usepackage[format=plain,indention=0.0mm,labelsep=space,
justification=centering,font={small,bf},skip=10pt,figureposition=below,
tableposition=above]{caption} % caption

\setlength{\floatsep}{10pt} % space between floats}
\setlength{\dblfloatsep}{10pt} % space between floats}
\setlength{\textfloatsep}{10pt} % space between text and floats
\setlength{\dbltextfloatsep}{10pt} % space between text and floats

%%%%%%%%%%%%
% abstract %
%%%%%%%%%%%%

\usepackage{abstract} % load package

\renewcommand{\abstractnamefont}{\normalfont\large\bfseries\raggedright} % change
% section format

\setlength{\abstitleskip}{0mm}

\setlength{\absleftindent}{0mm} % left margin
\setlength{\absrightindent}{8mm} % right margin

%%%%%%%%%%%%%%%%
% bibliography %
%%%%%%%%%%%%%%%%
\usepackage{url} % allow line break for URLs

\usepackage[square,comma,numbers,sort&compress]{natbib} % load package,
% define citation style

\setlength{\bibsep}{0mm} % no vertical space between refernece items

\begin{document}

\bibliographystyle{abbrv} % define references style

\title{\vspace{-9mm}\raggedright\textbf{%
  {\Large Title is Times New Roman 14 Continue on a second line if
  needed\\[-10pt]
  Put the paper number (3 digits) on top *** of this page.}\\[14pt]}
\vspace{2mm}
  \bf{{\large Leading author name\footnotemark[1], Other
  authors\footnotemark[1], and Last author\footnotemark[2]\\}}
}

\date{} % suppress date in title

\twocolumn[

  \maketitle

  \vspace{-15mm}

  \begin{tabular}{@{}p{82mm}@{}p{8mm}@{}p{82mm}@{}}

    \textbf{1} Affiliation (Times New Roman 10) & &
    \textbf{2} Affiliation (Times New Roman 10)\\
    Street, Number, Area code, City, Country, Email & &
    Street, Number, Area code, City, Country, Email

  \end{tabular}

  \vspace{4mm}

  \begin{onecolabstract} \setlength{\parindent}{0mm} \vspace{-18pt}

    \noindent\normalsize The Abstract title is written in Times New Roman 11 bolt.
    The Abstract is written in Times New Roman 10 and is aligned
    on both sides. The Abstract is written in Times New Roman 10 and is
    aligned on both sides. The Abstract is written in Times New Roman 10
    and is aligned on both sides. The Abstract is written in Times New
    Roman 10 and is aligned on both sides. The Abstract is written in
    Times New Roman 10 and is aligned on both sides. The Abstract is
    written in Times New Roman 10 and is aligned on both sides. The
    Abstract is written in Times New Roman 10 and is aligned on both
    sides. The Abstract is written in Times New Roman 10 and is aligned
    on both sides.The Abstract is written in Times New Roman 10 and is aligned
    on both sides.

    \textbf{Keywords:} Key words are written in Times New Roman
    10 (title is in bold).

  \end{onecolabstract}
  \vspace{8mm}
]

\setlength{\textheight}{243mm} % set default body height

\section*{Introduction}

All section titles are in Times new Roman 11, bold.  Section titles
start without indentation. The text is in Times New Roman 10 aligned on
both sides. First line of each paragraph indents .5 cm. Leave one line
spacing before the subsection title. No extra line spacing after the
Section title. Maximum length of the paper is 10 pages.  The text is in
Times New Roman 10 aligned on both sides. First line of each paragraph
indents .5 cm. Leave one line spacing before the subsection title. No
extra line spacing after the Section title. The text is in Times New
Roman 10 aligned on both sides. First line of each paragraph indents .5
cm. Leave one line spacing before the subsection title.
\begin{equation}
  Re = \frac{W_{\rm in} d_{\rm h, in}}{\nu}
\end{equation}
and text may continue after the equation without indent.

Equations indent .5 cm. They are numbered in increasing order. Numbers
are placed at the right side between brackets. Use SI units. Other units
can be placed between bracket after the SI value.

Legend of Tables are written before the table in Times New Roman 9 bold
and centered in the column.  One spacing before the legend of the table.

\begin{table}[b]
  \caption{Table Caption}
  \centering
  \footnotesize
  \begin{tabular}{|@{}l@{}|@{}l@{}|@{}l@{}|@{}l@{}|@{}l@{}|@{}l@{}|}
    \hline
    & $W_{\rm in} {\rm(m/s)}$ & $d_{\rm h, in}{\rm(m)}$ & $\rm rpm$ &
    $Re$ & $Ro$ \\ \hline
    $\mu$impeller & $290$ & $.0008$ & $400 000.$ & $15800$   & $0.26$ \\
    \hline
    impeller  & $290$ & $.016$  & $20 000$   & $316 000$ & $0.26$ \\
    \hline
    mode      & $2.5$ & $.079$  & $40.$      & $15800$   & $0.26$ \\
    \hline
  \end{tabular}
\end{table}

References are numbered in increasing order when they first appear in
the text \cite{citation} [1,2,3,4]. References are numbered in increasing order when
they first appear in the text [5,6]. The text is in Times New Roman 10
aligned on both sides. First line of each paragraph indents .5 cm.  Put
one line spacing before the subsection title. No extra line spacing
after the Section title.

The text is in Times New Roman 10 aligned on both sides. First line of
each paragraph indents .5 cm. Leave one line spacing before the
subsection title. No extra line spacing after the Section title. The
text is in Times New Roman 10 aligned on both sides.  First line of each
paragraph indents .5 cm. Put one line spacing before the subsection
title. No extra line spacing after the Section title.

Maximum length of the paper is 10 pages. Maximum length of the paper is
10 pages. Maximum length of the paper is 10 pages. Maximum length of the
paper is 10 pages. Maximum length of the paper is 10 pages. Do not
forget to put the paper number (3 digits) on top of first page. Do not
forget to put the paper number (3 digits) on top of first page. Do not
forget to put the paper number (3 digits) on top of first page.

\section*{Experimental Facility}

The text is in times new roman 10 aligned on both sides. First line of
each paragraph indents .5 cm. PUT One line spacing before the
subsection. The text is in times new roman 10 aligned on both sides.
First line of each paragraph indents .5 cm. Put one line spacing before
the subsection. The text is in times new roman 10 aligned on both sides.
First line of each paragraph indents .5 cm.  One line spacing before the
subsection.

The text is in times new roman 10 aligned on both sides. First line of
each paragraph indents .5 cm. Put one line spacing before the
subsection. The text is in times new roman 10 aligned on both sides.
First line of each paragraph indents .5 cm. One line spacing before the
subsection.

Color figures are allowed for the full paper

\begin{figure}
  \vspace{75mm}
  \caption{Legend is written in Times New Roman 9, bold and
  centered}
\end{figure}

The legend is written in Times New Roman 9, bold and centered. Put one
line spacing after the legend. The legend is written in Times New Roman
9, bold and centered. Put one line spacing after the legend. The legend
is written in Times New Roman 9, bold and centered. Put one line spacing
after the legend.

\begin{figure}
  \vspace{60mm}
  \caption{Color figures are allowed for the full paper.}
\end{figure}

The legend is written in Times New Roman 9, bold and centered. Put one
line spacing after the legend. The legend is written in Times New Roman
9, bold and centered. Put one line spacing after the legend. The legend
is written in Times New Roman 9, bold and centered. Put one line spacing
after the legend.Do not forget to put the paper number (3 digits) on top of first page.
Do not forget to put the paper number (3 digits) on top of first page.
Do not forget to put the paper number (3 digits) on top of first page.
The legend is written in Times New Roman 9, bold and centered. Put one
line spacing after the legend. The legend is written in Times New Roman
9, bold and centered. Put one line spacing after the legend. The legend
is written in Times New Roman 9, bold and centered. Put one line spacing
after the legend.Do not forget to put the paper number (3 digits) on top of first page.
Do not forget to put the paper number (3 digits) on top of first page.
Do not forget to put the paper number (3 digits) on top of first page.The legend is written in Times New Roman 9, bold and centered. Put one
line spacing after the legend. The legend is written in Times New Roman
9, bold and centered. Put one line spacing after the legend. The legend
is written in Times New Roman 9, bold and centered. Put one line spacing
after the legend.Do not forget to put the paper number (3 digits) on top of first page.
Do not forget to put the paper number (3 digits) on top of first page.
Do not forget to put the paper number (3 digits) on top of first page.

\section*{Conclusions}

The text is in times new roman 10 aligned on both sides. First line of
each paragraph indents .5 cm. Put one line spacing before the subsection
title. No extra line spacing after the section title.

Maximum number of pages is ten.

\section*{Acknowledgements}

The text is in times new roman 10 aligned on both sides. First line of
each paragraph indents .5 cm. Put one line spacing before the subsection
title. No extra line spacing after the section title.

The format for the references is shown below.

\bibliography{mybib}

\section*{References}

\begin{itemize}

  \item[[1]] Rothe, P.H., Johnston, J.P., (1976), Effects of System
  Rotation on the Performance of Two- Dimensional Diffusers, ASME
  Journal of Fluid Engineering, Vol.  98, No. 3, pp. 422-430

  \item[[2]] Moore J, (1973), A Wake and an Eddy in a Rotating Radial
  Flow Passage, Part 1: Experimental Observations, ASME Journal of
  Engineering for Power, Vol. 95, No.3.

  \item[[3]] Koyama HS, Uchikawa K, Nigim HH, (1997), Effects of
  Coriolis Force on Flow in Rotating Diffusers, AIAA Journal, Vol. 35,
  No.7.

  \item[[4]] Bons JP, Kerrebrock JL, (1999), Complementary Velocity and
  Heat Transfer Measurements in a Rotating Turbine Cooling Passage with
  Smooth Walls, ASME Journal of Turbomachinery, Vol. 121.

  \item[[5]] Di Sante A., Van den Braembussche R.A., (2007),
  Experimental and Numerical Investigation of the Flow in a Rotating
  Diverging Channel, ISAIF8- 00105.

  \item[[6]] Di Sante A., Van den Braembussche R.A., (2007), Measurement
  of low Reynolds Number Flow in Rotating Channels, ASME paper
  GT2007-27471.

  \item[[7]] Di Sante A., Van den Braembussche R.A., (2009),
  Experimental Study of Three-dimensional Vortical Flows in Rotating
  Channels, Proceedings of 10th European Turbomachinery Conference,
  Graz.

  \item[[8]] Di Sante A, Theunissen R, Van den Braembussche R.A. (2008),
  A New Facility for Time Resolved PIV Measurements in Rotating Channels
  Experiments in Fluids, Volume 44, Number 2, February, 2008.

\end{itemize}

\end{document}
